\documentclass[a4paper,11pt]{article}
\usepackage{array}
\usepackage{graphicx}

\begin{document}
\begin{titlepage}
\raggedleft
\vspace*{2cm}
\huge\bfseries
Nonstationary Signal\\
Processing with Application to\\
Reverberation Cancellation in\\
Acoustic Environments

\vfill
\normalsize\normalfont
A dissertation submitted to the\\
University of Cambridge for the\\
degree of Doctor of Philosophy

\vfill
{\setlength\arrayrulewidth{2pt}
\begin{tabular}{@{}>{\raggedleft}p{5.5cm}>{\raggedleft\arraybackslash}m{1.4cm}@{}}
\multicolumn{2}{r}{\textbf{James Robert Hopgood}}\\
\multicolumn{2}{r}{Queens’ College. November, 2000}\\
\multicolumn{2}{r}{\rule{7cm}{2pt}}\\[-1.5\normalbaselineskip]
\small\textsc{Signal Processing Labaratory}\\
Department of Engineering\\
University of Cambridge & 
  \raisebox{-1.5\height}{\includegraphics[width=1.4cm]{cam}}
\end{tabular}}
\end{titlepage}

foo
bar
baz
\end{document}
